0 0.2 0.4 0.6 0.8 1 1.2 eU (ppm) 0

0.5

1

1.5

2

2.5

3

Excess ^{21}Ne (atoms g^{-1})

10^7

Core - BGC/BGC Core - CRPG/BGC Core - CRPG/CRPG Core - Tulane/BGC Mackay Glacier erratics