10^6 10^7 10^8 10^9 Excess ^{21}Ne (atoms g^{-1})

0

1000

2000

3000

4000

5000

6000

Mass depth (g cm^{-2})

Entire core

2 4 6 Excess ^{21}Ne (10^8 atoms g^{-1})

0

100

200

300

400

500

Mass depth (g cm^{-2})

Spallation region

CRPG source/CRPG analysis UW source/BGC analysis CRPG source/BGC analysis Tulane source/BGC analysis

0 10 20 30 40 50

Mass depth (g cm^{-2})

Core top

0 0.5 1 [U] (ppm)

0 1 2 3 [Th] (ppm)